{
	"file path":	"/sdcard/cache/Nuka Cola Cap_plate_2.3mf",
	"subtask_name":	"Nuka Cola Cap_plate_2",
	"subtask id":	"144194990",
	"timelapse":	true,
	"bed_leveling":	false,
	"flow_cali":	false,
	"vibration_cali":	false,
	"layer_inspect":	true,
	"use ams":	true,
	"xy_mech_mode_sweep":	false,
	"auto_recovery":	true,
	"ams mapping":	[-1, -1, 2, 3],
	"tray info":	"[{\"id\":\"0\",\"humidity\":\"3\",\"temp\":\"0.0\",\"tray\":[{\"id\":\"0\",\"remain\":-1,\"k\":0,\"n\":1,\"tag_uid\":\"0C18BA3B00000100\",\"tray_id_name\":\"A00-K0\",\"tray_info_idx\":\"GFA00\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"PLA Basic\",\"tray_color\":\"000000FF\",\"tray_weight\":\"1000\",\"tray_diameter\":\"1.75\",\"tray_temp\":\"55\",\"tray_time\":\"8\",\"bed_temp_type\":\"1\",\"bed_temp\":\"35\",\"nozzle_temp_max\":\"230\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"803E803EE803E803CDCC4C3F\",\"tray_uuid\":\"AE1A9074C20F4EC19D3706928D72F03C\"},{\"id\":\"1\",\"remain\":-1,\"k\":0,\"n\":1,\"tag_uid\":\"0000000000000000\",\"tray_id_name\":\"\",\"tray_info_idx\":\"GFL03\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"\",\"tray_color\":\"0ACC38FF\",\"tray_weight\":\"0\",\"tray_diameter\":\"0.00\",\"tray_temp\":\"0\",\"tray_time\":\"0\",\"bed_temp_type\":\"0\",\"bed_temp\":\"0\",\"nozzle_temp_max\":\"240\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"000000000000000000000000\",\"tray_uuid\":\"00000000000000000000000000000000\"},{\"id\":\"2\",\"remain\":-1,\"k\":0,\"n\":1,\"tag_uid\":\"0000000000000000\",\"tray_id_name\":\"\",\"tray_info_idx\":\"GFL99\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"\",\"tray_color\":\"F72323FF\",\"tray_weight\":\"0\",\"tray_diameter\":\"0.00\",\"tray_temp\":\"0\",\"tray_time\":\"0\",\"bed_temp_type\":\"0\",\"bed_temp\":\"0\",\"nozzle_temp_max\":\"240\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"000000000000000000000000\",\"tray_uuid\":\"00000000000000000000000000000000\"},{\"id\":\"3\",\"remain\":-1,\"k\":0.019999999552965164,\"n\":1,\"tag_uid\":\"0000000000000000\",\"tray_id_name\":\"\",\"tray_info_idx\":\"GFL99\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"\",\"tray_color\":\"FFFFFFFF\",\"tray_weight\":\"0\",\"tray_diameter\":\"0.00\",\"tray_temp\":\"0\",\"tray_time\":\"0\",\"bed_temp_type\":\"0\",\"bed_temp\":\"0\",\"nozzle_temp_max\":\"240\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"000000000000000000000000\",\"tray_uuid\":\"00000000000000000000000000000000\"}]}]"
}