{
	"file path":	"/sdcard/cache/Poop Chute Pipe.3mf",
	"subtask_name":	"Poop Chute Pipe",
	"subtask id":	"67614275",
	"timelapse":	true,
	"bed_leveling":	true,
	"flow_cali":	true,
	"vibration_cali":	false,
	"layer_inspect":	true,
	"use ams":	true,
	"xy_mech_mode_sweep":	false,
	"auto_recovery":	false,
	"ams mapping":	[-1, 0],
	"tray info":	"[{\"id\":\"0\",\"humidity\":\"2\",\"temp\":\"0.0\",\"tray\":[{\"id\":\"0\",\"remain\":-1,\"k\":0.019999999552965164,\"n\":1,\"tag_uid\":\"FC31D43900000100\",\"tray_id_name\":\"A00-G1\",\"tray_info_idx\":\"GFA00\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"PLA Basic\",\"tray_color\":\"00AE42FF\",\"tray_weight\":\"250\",\"tray_diameter\":\"1.75\",\"tray_temp\":\"55\",\"tray_time\":\"8\",\"bed_temp_type\":\"1\",\"bed_temp\":\"35\",\"nozzle_temp_max\":\"230\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"88138813E803E8039A99193F\",\"tray_uuid\":\"0CD7EE2A5435412E8702B001CF3138B3\"},{\"id\":\"1\",\"remain\":-1,\"k\":0,\"n\":1.3999999761581421,\"tag_uid\":\"9D56A9C000000100\",\"tray_id_name\":\"A00-A0\",\"tray_info_idx\":\"GFA00\",\"tray_type\":\"PLA\",\"tray_sub_brands\":\"PLA Basic\",\"tray_color\":\"FF6A13FF\",\"tray_weight\":\"250\",\"tray_diameter\":\"1.75\",\"tray_temp\":\"55\",\"tray_time\":\"8\",\"bed_temp_type\":\"1\",\"bed_temp\":\"35\",\"nozzle_temp_max\":\"230\",\"nozzle_temp_min\":\"190\",\"xcam_info\":\"8813100EE803E8039A99193F\",\"tray_uuid\":\"B6E13C3A831A4690884C98286F04C4CB\"},{\"id\":\"2\"},{\"id\":\"3\"}]}]"
}